-- OCR日志表建表语句
-- 用于记录OCR识别操作的日志信息

CREATE TABLE `t_ocr_log` (
  `id` int(11) NOT NULL AUTO_INCREMENT COMMENT '主键ID',
  `table_name` varchar(100) DEFAULT NULL COMMENT '表名',
  `file_name` varchar(255) DEFAULT NULL COMMENT '文件名',
  `status_type` varchar(50) DEFAULT NULL COMMENT '转换状态',
  `failure_reason` text DEFAULT NULL COMMENT '失败原因',
  `create_time` datetime DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `update_time` datetime DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '更新时间',
  PRIMARY KEY (`id`),
  KEY `idx_table_name` (`table_name`),
  KEY `idx_file_name` (`file_name`),
  KEY `idx_status_type` (`status_type`),
  KEY `idx_create_time` (`create_time`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='OCR识别日志表';